Lets you specify your hardware configuration, your color preferences
for DAN's screen features, trace colors used when plotting on the
screen, and various other parameters that normally only need to be
set one time.

After setting the configuration items appropriately, press F2 to save
them so they do not need to be reset the next time you invoke DAN.

If you do not save them, they will remain in effect until you exit DAN.
